<template>
	<view class="selftTest">
		<view class="Tit">血脂</view>
		<view class="row">
			<view class="row_tit">总胆固醇</view>
			<view class="row_con">
				<view wx:if="Info.zdgc_status == '1'">较低</view>
				<view wx:if="Info.zdgc_status == '2'">正常</view>
				<view wx:if="Info.zdgc_status == '3'">较高</view>
			</view>
		</view>
		<view class="row">
			<view class="row_tit">高密度脂</view>
			<view class="row_con">
				<view wx:if="Info.gmdz_status == '1'">较低</view>
				<view wx:if="Info.gmdz_status == '2'">正常</view>
				<view wx:if="Info.gmdz_status == '3'">较高</view>
			</view>
		</view>
		<view class="row">
			<view class="row_tit">甘油三脂</view>
			<view class="row_con">
				<view wx:if="Info.gysz_status == '1'">较低</view>
				<view wx:if="Info.gysz_status == '2'">正常</view>
				<view wx:if="Info.gysz_status == '3'">较高</view>
			</view>
		</view>
		<view class="row">
			<view class="row_tit">低密度脂</view>
			<view class="row_con">
				<view wx:if="Info.dmyh_status == '1'">较低</view>
				<view wx:if="Info.dmyh_status == '2'">正常</view>
				<view wx:if="Info.dmyh_status == '3'">较高</view>
			</view>
		</view>
		<view class="row">
			<view class="row_tit">冠心病指数</view>
			<view class="row_con">
				<view wx:if="Info.gxbzs_status == '1'">较低</view>
				<view wx:if="Info.gxbzs_status == '2'">正常</view>
				<view wx:if="Info.gxbzs_status == '3'">较高</view>
			</view>
		</view>
		<view class="row none">
			<view class="row_tit">动脉硬化</view>
			<view class="row_con">
				<view wx:if="Info.dmyh_status == '1'">较低</view>
				<view wx:if="Info.dmyh_status == '2'">正常</view>
				<view wx:if="Info.dmyh_status == '3'">较高</view>
			</view>
		</view>
		<view class="gray"></view>
		<view class="Tit">常规项目</view>
		<view class="row type2">
			<view class="row_tit">体重</view>
			<view class="row_con">
				<view wx:if="Info.tz_status == '1'">较低</view>
				<view wx:if="Info.tz_status == '2'">正常</view>
				<view wx:if="Info.tz_status == '3'">较高</view>
			</view>
		</view>
		<view class="row type2">
			<view class="row_tit">心率</view>
			<view class="row_con">
				<view wx:if="Info.xl_status == '1'">较低</view>
				<view wx:if="Info.xl_status == '2'">正常</view>
				<view wx:if="Info.xl_status == '3'">较高</view>
			</view>
		</view>
		<view class="row none">
			<view class="row_tit">体温</view>
			<view class="row_con">
				<view wx:if="Info.tw_status == '1'">较低</view>
				<view wx:if="Info.tw_status == '2'">正常</view>
				<view wx:if="Info.tw_status == '3'">较高</view>
			</view>
		</view>
		<view class="gray"></view>
		<view class="Tit">尿酸</view>
		<view class="row none">
			<view class="row_tit">尿酸</view>
			<view class="row_con">
				<view wx:if="Info.ns_status == '1'">较低</view>
				<view wx:if="Info.ns_status == '2'">正常</view>
				<view wx:if="Info.ns_status == '3'">较高</view>
			</view>
		</view>
		<view class="gray"></view>
		<view class="Tit">血压</view>
		<view class="row">
			<view class="row_tit">收缩压</view>
			<view class="row_con">
				<view wx:if="Info.ssy_status == '1'">较低</view>
				<view wx:if="Info.ssy_status == '2'">正常</view>
				<view wx:if="Info.ssy_status == '3'">较高</view>
			</view>
		</view>
		<view class="row">
			<view class="row_tit">舒张压</view>
			<view class="row_con">
				<view wx:if="Info.szy_status == '1'">较低</view>
				<view wx:if="Info.szy_status == '2'">正常</view>
				<view wx:if="Info.szy_status == '3'">较高</view>
			</view>
		</view>
		<view class="row none">
			<view class="row_tit">脉搏</view>
			<view class="row_con ">
				<view wx:if="Info.mb_status == '1'">较低</view>
				<view wx:if="Info.mb_status == '2'">正常</view>
				<view wx:if="Info.mb_status == '3'">较高</view>
			</view>
		</view>
		<view class="gray"></view>
		<view class="Tit">眼科</view>
		<view class="row">
			<view class="row_tit">左眼视力</view>
			<view class="row_con">
				<view wx:if="Info.zysl_status == '1'">较低</view>
				<view wx:if="Info.zysl_status == '2'">正常</view>
				<view wx:if="Info.zysl_status == '3'">较高</view>
			</view>
		</view>
		<view class="row none">
			<view class="row_tit">右眼视力</view>
			<view class="row_con ">
				<view wx:if="Info.yysl_status == '1'">较低</view>
				<view wx:if="Info.yysl_status == '2'">正常</view>
				<view wx:if="Info.yysl_status == '3'">较高</view>
			</view>
		</view>

	</view>

</template>

<script>
	export default {
		data() {
			return {
				id: "",
				Info: "",
			}
		},
		methods: {

		},
		onLoad(options) {
			let that = this
			this.id = options.id
		}
	}
</script>

<style>
	.selftTest {
		padding: 30rpx 20rpx;
		padding-top: 0;
	}

	.Tit {
		font-weight: bold;
		font-size: 32rpx;
		color: #222222;
		margin-bottom: 25rpx;
		margin-top: 30rpx;
	}

	.row {
		display: flex;
		align-items: center;
		justify-content: space-between;
		padding: 30rpx 0;
		border-bottom: 1rpx solid #E6E6E6;
		box-sizing: border-box;
	}

	.row_tit {
		font-weight: 400;
		font-size: 26rpx;
		color: #999999;
	}

	.row_con {
		display: flex;
		align-items: center;
		font-weight: 400;
		font-size: 26rpx;
		color: #72BB4E;
	}

	.row_con input {
		text-align: right;
	}

	.none {
		border-bottom: none;
	}

	.type2 {
		color: #FF512A;
	}
</style>